0.0 0.2 0.4 0.6 0.8 1.0

Recall 0.0

0.2

0.4

0.6

0.8

1.0

Recall and Precisions for All Transitions

= = = = ==== = = x x

x x

x

x

+ ++

+

+

+

+ +

+

+

#

* *

0.0 0.2 0.4 0.6 0.8 1.0 Recall 0.0

0.2

0.4

0.6

0.8

1.0

Precision

Recall and Precision for Cuts

=== = == = = x x

x x x

x+ ++

+

+

+

+

+

+

+

#

* *

0.0 0.2 0.4 0.6 0.8 1.0 Recall 0.0

0.2

0.4

0.6

0.8

1.0

Precision

Recall and Precision for Gradual Transitions

= = = == = = = = = x

x

x x

x x

+

++

+

+ + + +

+

+

# * *

0.0 0.2 0.4 0.6 0.8 1.0 Recall 0.0

0.2

0.4

0.6

0.8

1.0

Precision

FrameRecall and FramePrecision for Gradual Transitions

=

=

=

==

=

=

=

=

xxx x

x

x

+++ + + + + +

+

+

#

* *